Exterior

D   D

A   A

H
H

E   E

Folded Size: 9.5625”W x 6.5”H  |  Flat Size: 28.63”W x 19.5”H

Cover

B   B

BLEED: Your file needs to include a 0.125” bleed necessary for production. Bleed is printing that goes beyond the edge of the sheet after trimming. If a bleed is not included in document setup, there is a good chance there will be a gap between the edge of the printed area and the cut line. This happens because there is a tolerance when cutting the printed piece. For more information on the importance of bleed, visit our website: support.smartpress.com/print-file-preparation/bleeds-borders

CUT LINE (finished size):  This is where your artwork will be trimmed.

SAFE MARGIN: Your file needs to include a 0.125” safe margin necessary for production. Safe margin is the area around the edge of the sheet. If the safe margin is not included in document setup, there is a chance that the art close to the edge will get cut off, due to machine shift during cutting. This happens because there is a tolerance when cutting the printed piece. For more information on Cutting Tolerance, visit our website: support.smartpress.com/print-file-preparation/cutting-tolerance

Folds:  The orange lines indicate where the folds will be. Follow the folds in alphabetical order (e.g., A|A is the first fold, B|B is the second fold, etc).

G
G

F   F

Fold by

C   C