0.5” non-visable printed area

SAFE AREA
45.25” W x 76.5” H

viewable Finished Area
47.25” W x 78.5” H

dieline
47.25” W x 85” H

BLEED AREA
47.75” W x 85.5” H
IMAGE MUST EXTEND TO EDGES

CUSTOMERS – when saving your final art or writing a PDF, please shut off all layers except for the ART. The lines and text on these shut off layers are For Position Only, to help you layout your art.

47.25”  Retractable  Banner

6” non-visable printed area